Reactant 1: 0.10 g NaCl R moles NaCl R moles AgCl R g AgCl 0.10 g NaCl 3 3 3 5 0.25 g AgCl Reactant 2: 0.10 g AgNO_3 R moles AgNO_3 R moles AgCl R g AgCl 0.10 g AgNO_3 3 3 3 5 0.084 g AgCl

143.321 g AgCl } } 1 mol AgCl

1 mol AgCl} } 1 mol AgNO_3

1 mol AgNO_3

} } }

169.872 g AgNO_3

143.321 g AgCl } } 1 mol AgCl

1 mol AgCl } } 1 mol NaCl

1 mol NaCl} } 58.443 g NaCl